From 7550835f47ab1637966f802f2d0ff99cc63dd761 Mon Sep 17 00:00:00 2001
From: Vincent Richard <vincent@vincent-richard.net>
Date: Wed, 13 Mar 2013 17:47:47 +0100
Subject: Fixed and clarified text about handleTimeout() return value.

---
 doc/book/net.tex | 8 +++++---
 1 file changed, 5 insertions(+), 3 deletions(-)

(limited to 'doc/book/net.tex')

diff --git a/doc/book/net.tex b/doc/book/net.tex
index 52ba665a..7653b48e 100644
--- a/doc/book/net.tex
+++ b/doc/book/net.tex
@@ -703,9 +703,11 @@ class timeoutHandler : public object
 While the operation runs, the service calls {\vcode isTimeout()} at variable
 intervals. If the {\vcode isTimeout()} function returns {\vcode true},
 then {\vcode handleTimeout()} is called. If the {\vcode handleTimeout()}
-function also returns {\vcode true}, the
-operation is cancelled and an {\vcode operation\_timed\_out} exception is
-thrown. The function {\vcode resetTimeout()} is called each time data has
+function returns {\vcode false}, the operation is cancelled and
+an {\vcode operation\_timed\_out} exception is thrown. Else, if
+{\vcode handleTimeout()} returns true, the operation continues and the
+time-out count is reset.
+The function {\vcode resetTimeout()} is called each time data has
 been received from the server to reset time-out delay.
 
 The following example shows how to implement a simple time-out handler:
-- 
cgit v1.2.3

