From 86788ce022767eb706f8cb60fa79d08ad4724131 Mon Sep 17 00:00:00 2001
From: Vincent Richard <vincent@vincent-richard.net>
Date: Thu, 13 Mar 2014 20:49:54 +0100
Subject: Removed unused/unimplemented function.

---
 doc/book/basics.tex | 7 -------
 1 file changed, 7 deletions(-)

(limited to 'doc/book/basics.tex')

diff --git a/doc/book/basics.tex b/doc/book/basics.tex
index 62cedb9e..fefd0515 100644
--- a/doc/book/basics.tex
+++ b/doc/book/basics.tex
@@ -806,8 +806,6 @@ of progress when they are performing an operation.
 The {\vcode vmime::utility::progressListener} interface is rather simple:
 
 \begin{lstlisting}
-const bool cancel() const;
-
 void start(const int predictedTotal);
 void progress(const int current, const int currentTotal);
 void stop(const int total);
@@ -818,8 +816,3 @@ of the operation, respectively. {\vcode progress()} is called each time the
 status of progress changes (eg. a chunk of data has been processed). There is
 no unit specified for the values passed in argument. It depends on the
 notifier: it can be bytes, percent, number of messages...
-
-Your listener can return {\vcode} in the {\vcode cancel()} method to cancel
-the operation. However, be warned that cancelling is not always supported by
-the source object.
-
-- 
cgit v1.2.3

