\hypertarget{CoreCommonUtil_8h_source}{}\doxysection{Core\+Common\+Util.\+h}
\label{CoreCommonUtil_8h_source}\index{src/core/common/CoreCommonUtil.h@{src/core/common/CoreCommonUtil.h}}

\begin{DoxyCode}{0}
\DoxyCodeLine{1 }
\DoxyCodeLine{27 \textcolor{preprocessor}{\#ifndef GPGFRONTEND\_CORECOMMONUTIL\_H}}
\DoxyCodeLine{28 \textcolor{preprocessor}{\#define GPGFRONTEND\_CORECOMMONUTIL\_H}}
\DoxyCodeLine{29 }
\DoxyCodeLine{30 \textcolor{preprocessor}{\#include "{}core/GpgFrontendCore.h"{}}}
\DoxyCodeLine{31 }
\DoxyCodeLine{32 \textcolor{keyword}{namespace }\mbox{\hyperlink{namespaceGpgFrontend}{GpgFrontend}} \{}
\DoxyCodeLine{33 }
\DoxyCodeLine{34 \textcolor{keyword}{class }GPGFRONTEND\_CORE\_EXPORT \mbox{\hyperlink{classGpgFrontend_1_1CoreCommonUtil}{CoreCommonUtil}} : \textcolor{keyword}{public} QObject \{}
\DoxyCodeLine{35   Q\_OBJECT}
\DoxyCodeLine{36  \textcolor{keyword}{public}:}
\DoxyCodeLine{41   \textcolor{keyword}{static} \mbox{\hyperlink{classGpgFrontend_1_1CoreCommonUtil}{CoreCommonUtil}} *GetInstance();}
\DoxyCodeLine{42 }
\DoxyCodeLine{47   \mbox{\hyperlink{classGpgFrontend_1_1CoreCommonUtil}{CoreCommonUtil}}() = \textcolor{keywordflow}{default};}
\DoxyCodeLine{48 }
\DoxyCodeLine{49  signals:}
\DoxyCodeLine{50 }
\DoxyCodeLine{55   \textcolor{keywordtype}{void} SignalGnupgNotInstall();}
\DoxyCodeLine{56 }
\DoxyCodeLine{57  \textcolor{keyword}{private}:}
\DoxyCodeLine{58   \textcolor{keyword}{static} std::unique\_ptr<CoreCommonUtil> instance\_;  }
\DoxyCodeLine{59 \};}
\DoxyCodeLine{60 }
\DoxyCodeLine{61 \}  \textcolor{comment}{// namespace GpgFrontend}}
\DoxyCodeLine{62 }
\DoxyCodeLine{63 \textcolor{preprocessor}{\#endif  }\textcolor{comment}{// GPGFRONTEND\_CORECOMMONUTIL\_H}}

\end{DoxyCode}
