\hypertarget{structGpgFrontend_1_1UI_1_1KeyListRow}{}\doxysection{Gpg\+Frontend\+::UI\+::Key\+List\+Row Struct Reference}
\label{structGpgFrontend_1_1UI_1_1KeyListRow}\index{GpgFrontend::UI::KeyListRow@{GpgFrontend::UI::KeyListRow}}


Collaboration diagram for Gpg\+Frontend\+::UI\+::Key\+List\+Row\+:
% FIG 0
\doxysubsection*{Public Types}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{structGpgFrontend_1_1UI_1_1KeyListRow_ade4a3f198d1be1659152519fd9fff7f6}\label{structGpgFrontend_1_1UI_1_1KeyListRow_ade4a3f198d1be1659152519fd9fff7f6}} 
using {\bfseries Key\+Type} = unsigned int
\end{DoxyCompactItemize}
\doxysubsection*{Static Public Attributes}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{structGpgFrontend_1_1UI_1_1KeyListRow_a2f141b7a3e28f9354bfb7d2c077a749c}\label{structGpgFrontend_1_1UI_1_1KeyListRow_a2f141b7a3e28f9354bfb7d2c077a749c}} 
static const Key\+Type {\bfseries SECRET\+\_\+\+OR\+\_\+\+PUBLIC\+\_\+\+KEY} = 0
\item 
\mbox{\Hypertarget{structGpgFrontend_1_1UI_1_1KeyListRow_a53f8d78eb222490c72168a2571e6ea89}\label{structGpgFrontend_1_1UI_1_1KeyListRow_a53f8d78eb222490c72168a2571e6ea89}} 
static const Key\+Type {\bfseries ONLY\+\_\+\+SECRET\+\_\+\+KEY} = 1
\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
src/ui/widgets/Key\+List.\+h\end{DoxyCompactItemize}
